Dangerous Risks – Acrylic, Artificial Nails

On behalf of Dr. Lawrence Jaeger and the medical staff at Advanced Dermatology Associates, we are extremely focused on ensuring optimum health is a choice for everyone. As the leading Dermatologist provider network in New York City, we strongly encourage both men and women to educate themselves with the proper knowledge and to seek the … Continue reading Dangerous Risks – Acrylic, Artificial Nails →

The post Dangerous Risks – Acrylic, Artificial Nails appeared first on Dr. Lawrence Jaeger, NYC Osteopathic.